\[\int_{0}^{\infty}x^{s-1}(\theta_{3}\left(0\middle|ix^{2}\right)-1)\,\mathrm{d}%
x=\pi^{-s/2}\Gamma\left(\tfrac{1}{2}s\right)\zeta\left(s\right),\]