\[\int_{0}^{\infty}e^{2\mathrm{i}h\cosh z\cosh t}\operatorname{Ge}_{m}\left(t,h^%
{2}\right)\,\mathrm{d}t=\tfrac{1}{2}\pi{\mathrm{i}}^{m+1}\operatorname{ge}_{m}%
\left(0,h^{2}\right){\operatorname{Ms}^{(3)}_{m}}\left(z,h\right).\]