\[\frac{{\mathrm{d}}^{2}u_{2}}{{\mathrm{d}\beta}^{2}}+(h-\nu(\nu+1)k^{2}{%
\operatorname{sn}}^{2}\left(\beta,k\right))u_{2}=0,\]