\[\dfrac{1}{2\pi}\int_{\mathcal{L}_{1}}e^{2\mathrm{i}hw}\operatorname{me}_{\nu}%
\left(t,h^{2}\right)\,\mathrm{d}t=e^{\mathrm{i}\nu\pi/{2}}\operatorname{me}_{%
\nu}\left(\alpha,h^{2}\right){\operatorname{M}^{(1)}_{\nu}}\left(z,h\right).\]